01 1 0 1 4 2 1 0 1 4 3 1 0 1 4 4 1 0 1 4 5 1 0 1 4 01 0 2 0 3 0 4 0 5 0 0 : 0 0 : 0 0 : 0 0 0 : 0 6 : 0 0 : 0 0 0 : 1 2 : 0 0 : 0 0 0 : 1 8 : 0 0 : 0 0 1 : 0 0 : 0 0 : 0 0 Data Taking at Constant Luminosity of2 Æ 1 0 3 1 cm- 2 s- 1 throughout a day

Antiproton Current (mA)

L u m i n o s i t y ( 1 0

30 cm

- 2 s

- 1

)

H2 Gas Jet Density (at/cc)T i m e ( h o u r s ) May 14, 2000May 15, 2000